(b) (c)

(e) (f)

Isosurface

Sensor n_2 n_1

Dmax

Dmin (a)

(d) Sensor

(g)

(a) (b)

(c) (d)

(e) (f)

(g)

Unseen

Empty Near surface

W(x) = 0 W(x) > 0

W(x) = 0

Sensor

Unseen

Empty

Observed isosurface

Hole fill isosurface

Near surface

(a) (b)

D(x) = D_{min}

D(x) = D_{max}

min max

D < D(x) < D